]^2

Invariant Mass [GeV/c

-π^+π

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

2 Count / 15 MeV/c

-400

-200 0 200 400 600 800 1000

1200

1400

1600