-2 ) (GeV/c) T dydp Tpπ N)/(2 2(d

1

10

0-10% 10-30% 30-60% 0-60%

+K (a)

(GeV/c) Tp 0.2 0.4 0.6 0.8

-2 ) (GeV/c) T dydp Tpπ N)/(2 2(d

1

10 0-10% 10-30% 30-60% 0-60%

- K

(b)