(MeV) Bμ 0 100 200 300 400 500 600 700 800

T (MeV)

0 50 100 150 200 250 300 350 9.2 GeV Chemical Freeze-out 9.2 GeV Kinetic Freeze-out Chemical Freeze-out Kinetic Freeze-out QCD Critical Point (Lattice) CT

Cross-over

initial T

initial T

RHIC Critical Point Search