(GeV/c) Tp 0 0.5 1 1.5 2 2.5

2v

0

0.05

0.1

0.15

0.2 -+h^+h π p π Au+Au 9.2 GeV (0-60%) Pb+Pb 8.8 GeV (0-43.5%)