(GeV/c) Tp 0 1 2 3 4 5

(%) 2v

-10

0

10

20

30

40 (TOF) dd+ (TPC) d He^3 He+ 3 BW fit dd, He BW fit 3

(a)

0 50 100 150 200 250 300 350

/A (%) 2v

-2

0

2

(c)

<0.7 GeV/c T : 0.2<p d <0.24 GeV/c T : 0.16<p p

/A (GeV/c) Tp 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

/A (%) 2v

0

5

10^p Λ+Λ p BW

coal d dyn d

(b) > part <N 0 50 100 150 200 250 300 350

/A (%) 2v

-2

0

2

d p d BW p BW

<1.0 GeV/c T : 0.7<p d <0.48 GeV/c T : 0.4<p p