|Rigidity|(GeV/c)

0 1 2 3 4 dE/dx(keV/cm)

0 5 10 15 20 25 30 (a)

He) 3Z( -0.4 -0.2 0 0.2 0.4

Counts

0

50

100

150

200 <6 GeV/c T 2<p He^3 He^3 (b)

dσn -2 0 2

Counts

0

1000

2000

3000

4000 anti-deuteron

<1.0 GeV/c T 0.7<p (c)

)^4/c^2

(GeV 2m 2.5 3 3.5 4 4.5

Counts

0

50

100

deuteron <3.0 GeV/c T 2.5<p

(d)