[GeV/c]

t,trig p 3 3.5 4 4.5 5 5.5 6 6.5 7 7.5 ridge Y

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2

Au+Au central, ZYAM normalization

Ridge