|ηΔ|

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

=0.3) δ;ηΔ(

slice Y

0 0.02

0.04

0.06

0.08 0.1 0.12

Au+Au central < 4 GeV/c

trig t 3 < p < 6 GeV/c

trig t 4 < p < 10 GeV/c

trig t 6 < p

|<1.8 ηΔ Fit to 1<| Constant Linear

<4 GeV/c

trig t for 3<p

0.24

0.26