ϕΔ

-3 -2 -1 0 1 2 3

ηΔ

-1.5 -1 -0.5 0 0.5 1 1.5

)ηΔ dϕΔ

N/(d 2d

46 47 48 49 50 51 52 53 -3 10

Au+Au central 3<pttrig<4 GeV/c