0 2 4 6 8 10 12 0 0.5 1 1.5 2 0-80% ±π /STAR 0π STAR _0 π /PHENIX 0π STAR

0 2 4 6 8 10 12 0 0.5 1 1.5 2 0-20%

= 200 GeV NNs Au+Au at

0 2 4 6 8 10 12 0 0.5 1 1.5 2 20-40%

0 2 4 6 8 10 12 0 0.5 1 1.5 2 40-80%

(GeV/c) T Transverse Momentum p

Spectra Ratio