0 20 40 60 80 100 120

310

410

510 Data

Simulation

SVT

SSD Inner Field Cage

TPC Gas

0 1 2 3 4 5 1.2

1.4

1.6

1.8

2

Conversion Radius (cm) (GeV/c)_T p^0π

Counts

Conv. Prob. Correction