〉_{part} N〈 0 100 200 300

)〉 part N〈 N / ( 0.5

0 1 2 3 4 5 6 7 8 Au+Au 200 GeV Au+Au 62.4 GeV Cu+Cu 200 GeV Cu+Cu 62.4 GeV

Au+Au 200 GeV Au+Au 62.4 GeV Cu+Cu 200 GeV Cu+Cu 62.4 GeV

(STAR) γ N = N (PHOBOS) ch N = N

< -2.3 η -3.7 <