η -3.5 -3 -2.5

η/d_γdN

0 100 200 300 400 500 600 Au+Au 200 GeV HIJING

η -3.5 -3 -2.5

η/d_γdN

0 50 100 150 200 250 300^{0-5%}_{5-10%}

0-10% 10-20% 20-30% 30-40% 40-50% 50-60% 60-70%

Au+Au 62.4 GeV

η -3.5 -3 -2.5

η/d_γdN

0 20 40 60 80 100 120 140 160 180 Cu+Cu 200 GeV

η -3.5 -3 -2.5

η/d_γdN

0 10 20 30 40 50 60 70 80 Cu+Cu 62.4 GeV