0 0.5 1 1.5 2 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 (c) p+p

FB Correlation Strength b

ηΔ

0 0.1 0.2 0.3 0.4 0.5 (b) Au+Au 10-20%

20-30%

30-40%

40-50% 50-80%

FB Correlation Strength b

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0-10%

ZDC central ~ 0-10%

Au+Au (a)

FB Correlation Strength b