]^2

[GeV/c Tm 0.2 0.3 0.4 0.5

0.2 0.3 0.4 0.5

0.8 1 1.2

0.8 1 1.2

side / R outR

]^2

[GeV/c Tm 0.2 0.3 0.4 0.5

[fm]

long R

3 4 5 6 7

3 4 5 6 7 0.2 0.3 0.4 0.5 3 4 5 6

3 4 5 6

[fm]

side R

0.2 0.3 0.4 0.5

[fm] outR

3 4 5 6

3 4 5 6^{0.2 0.3 0.4 0.5}

λ

0.2 0.3 0.4 0.5

0.2 0.3 0.4 0.5

λ

) [0-5]%

-π + ^+π

200 GeV Au+Au (

) [0-10]%

-π + ^+π

200 GeV Cu+Cu (