1/3)η/d_{ch} (dN 4 6 8

[fm]

long R

0 2 4 6 4 6 8

[fm]

side R

2 4 6 200 GeV Cu+Cu 62.4 GeV Cu+Cu 200 GeV Au+Au 62.4 GeV Au+Au

< 0.25 GeV/c T 0.15 < k

4 6 8

[fm] outR

2 4 6