0.01

0.1

1 10 Au+Au

Cu+Cu p+p = 200 GeV

NNs = 62.4 GeV NNs

1 10^210

> part

dN/dy/<N

0.005

0.01

0.02

62.4 GeV

-π+^+π

= 200 GeV NNs

1 10^210

= 62.4 GeV NNs

1 2 3 4 10 20 100 200 500 600 700 800 900 1000

1100

1200

1300 = 200 GeV NNs

1 2 3 4 10 20 100 200

= 62.4 GeV NNs

dN/dy > part

dN/dy/<N > (MeV/c) T<p

> part

Average Number of Participating Nucleons <N