(GeV/c) T Transverse Momentum p

0 1 2 3 4 5

)^2 Mass (GeV/c ϕ

1.015

1.016

1.017

1.018

1.019

1.02

1.021

1.022

1.023

1.024 0-10% 10-20% 20-30% 30-40%

40-50% 50-60% Monte Carlo (embedding)

Cu+Cu 200 GeV