)^2

(GeV/c invM

0.98 1 1.02 1.04 1.06 1.08 1.1

)^2 (1/MeV/c inv dN/dM

0 1000

2000

3000

4000

5000 10-20% Cu+Cu 200 GeV < 1.5 GeV/c T 1.2 < p