1 1.02 1.04 1.06 1.08 1.1

0.015

0.02

0.025

0.03

0.035

0.04

Au+Au 200 GeV (0-80%)

-0.005

0

0.005

0.01

0.015

0.02

〉)_2Ψ-_{-K+K}φ sin2( 〈

< 1.0 GeV/c T 0.5 < p

〉)_2Ψ-_{-K+K}φ cos2( 〈

)^2

Invariant Mass (GeV/c