π Entries/0.2

0 0.5 1 1.5 2 2.5 3 240 260 280 300 320 340 360 380 310 × / ndf

2χ 1.898 / 3 A 4442±

2.943e+05 obs_2v 0.01018 ± 0.07392 ±

< 2.0 GeV/c T 1.5 < p

Au+Au 200 GeV (0-80%)

(Rad) Ψ-φ