Entries/MeV

)^2

Invariant Mass (GeV/c

0.98 0.99 1 1.01 1.02 1.03 1.04 1.05 1.06 1.07 0 200 400 600 800 1000

1200

1400 d+Au 200 GeV (0-100%) <0.8 GeV/c T 0.4<p

-dip-angle cut δ with

-dip-angle cut δ without