0 1 2 3 4 5

-110

Au+Au 200 GeV 60-80%

0-5% d+Au 200 GeV 40-100%

0-20%

Au+Au 62.4 GeV 60-80%

0-20%

Scaling binary participant

cpR

(GeV/c) Tp