0 1 2 3 4 5 -1 10

1 Au+Au 200 GeV

0 SK Λ +Λ ϕ : 60-80%

0-5% : 60-80%

0-12% -π++π pp+

(GeV/c) Tp

0 1 2 3 4 5 -1 10

1

Scaling

binary participant

0 SK Λ +Λ ϕ

40-60%

0-5%

Au+Au 200 GeV cpR cpR