0 50 100 150 200 250 300 350 400

0.01

0.015

0.02

0.025

0.03

0.035

0.04

Au+Au 62.4 GeV

Au+Au 130 GeV

Au+Au 200 GeV p+p 200 GeV d+Au 200 GeV

-π/ϕ

part N

10^210 0 0.005

0.01

0.015

0.02

0.025

0.03

A + A p + p

-π/ϕ

(GeV) NNs