[GeV/c] p

]^{-2} [(GeV/c) 2 dN/dp decay / thermal

0.2 0.4 0.6 0.8 1 1.2 1.4 -5 10 -4 10 -3 10 -2 10 -1 10 1 spectra -K

inclusive -K thermal -K decay 0K* decay ϕ

0.2 0.4 0.6 0.8 1 1.2 1.4 0 0.5 1 1.5 2 2.5 3 3.5 inclusive -K thermal -K decay 0K* decay ϕ