(GeV) NNs 1 10^210^310

πK/

0 0.05 0.1 0.15 0.2 0.25 0.3 +π/^+

Open: K -π/^-

Filled: K

AGS Au+Au SPS Pb+Pb STAR Au+Au

ISR pp STAR pp

0.68

-2.26 NNs log(

0.051* /NDF=27/9 2χ

(a)