Optical Glauber

part N 0 100 200 300

/2) part

/ (N η/d ch dN

0

2

4

6

/ndf=0.73 2χ 0.03, ± EKRT 200 : C=0.83 /ndf=0.72 2χ 0.03, ± EKRT 62.4: C=0.91

/ndf 2χ hard x ppn 0.01, 1.38 ± K-N 200 : 2.43, 0.14 0.01, 0.41 ± K-N 62.4: 2.01, 0.10

MC Glauber

part N 100 200 300 400

/ndf=3.07 2χ 0.02, ± EKRT 200 : C=0.75 /ndf=3.15 2χ 0.03, ± EKRT 62.4: C=0.81

/ndf 2χ hard x ppn 0.01, 0.12 ± K-N 200 : 2.43, 0.13 0.01, 0.03 ± K-N 62.4: 2.01, 0.08