]^{-1} [fm /dy/S πdN 0 0.5 1 1.5 2 2.5

> [GeV/c] <p

0

0.2

0.4

0.6

0.8

1

1.2

-π^-K p

Au+Au 62.4 GeV Au+Au 130 GeV Au+Au 200 GeV pp 200 GeV

/dy/S π dN > = 0.38+0.33 <p /dy/S π dN > = 0.38+0.16 <p /dy/S π dN > = 0.29+0.07 <p