dca [cm]

0 2 4 6

]^{-1} dN/d(dca) [cm

-3 10

-2 10

-1 10

1 < 0.75 GeV/c

Au+Au 0-5%, 0.70 < p p p fitted p scaled p_{29.1}

-dca/0.58 1-e bkgd: 0.012

/ndf = 1.06 2χ