dca [cm]

0 2 4 6 8 10

]^{-1} dN/d(dca) [cm

0

0.05

0.1

0.15

0.2 < 0.45 GeV/c

Au+Au 0-5%, 0.40 < p p p fitted p scaled p_{2.8}

-dca/1.30 1-e bkgd: 0.094

/ndf = 1.13 2χ