[GeV/c] p 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

(all vertex) dN/dp

(correct vertex) dN/dp

0.85 0.9 0.95 1 1.05 1.1

pp 200 GeV MB

d+Au 200 GeV MB