0 0.5 1 1.5

-0.05

0

0.05

(pp 200 GeV) π (Au+Au 62.4 GeV) π

0 0.5 1 1.5

(pp 200 GeV) K (Au+Au 62.4 GeV) K

0 0.5 1 1.5

(pp 200 GeV) p (Au+Au 62.4 GeV) p

[GeV/c]

meas p

[GeV/c]

MC p

measp