0 50 100 150 200 250 300 350

+-,dyn ν

-0.07

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01

0.00 0-5% 10-20% 30-40% 40-50% 50-60%

60-70%

70-80% AuAu 200 GeV (a)

ϕ 0 50 100 150 200 250 300 350

+-,dyn ν

-0.050

-0.045

-0.040

-0.035

-0.030

-0.025

-0.020

-0.015

-0.010

CuCu 200 GeV

0-10% 10-20% 20-30%

30-40%

40-50%

(b)