η 0.0 0.2 0.4 0.6 0.8 1.0 1.2

(1)|

+-,dyn ν)/|η( +-,dyn ν

-1.8

-1.6

-1.4

-1.2

-1.0

-0.8

pp 200 GeV CuCu 200 GeV AuAu 200 GeV AuAu 62.4 GeV CuCu 62.4 GeV

(a) Central