(GeV) NNs 0 50 100 150 200 corr +-,dyn ν

-0.005

-0.004

-0.003

-0.002

-0.001

0.000

CERES PHENIX STAR AuAu STAR CuCu

>_{ch} <N 4 + +-,dyn

ν =

corr +-,dyn ν