beam - y η -4 -2 0

(%) 1v

-8 -6 -4 -2 30% - 60%

Data AMPT

= 0 CMy

200 GeV Au+Au 200 GeV Cu+Cu 62.4 GeV Au+Au 62.4 GeV Cu+Cu