(GeV/c) tp 0 1 2 3 4

(%) 1v

-0.2 0 0.2 0.4 | < 1.3 η| 200 GeV Au+Au y = 1

(GeV/c) tp 0 0.5 1 1.5 2

(%) 1v

-4

-2

0 0 - 5% 5 - 40% 40 - 80%

| < 4 η 2.5 < | y = 3