η -6 -4 -2 0 2 4 6

(%) 1v

-3 -2 -1 0 1 2 3

PHOBOS: 6 - 40%

0 - 5%

: 0 - 5%

〉 _t p〈 /〉 _x p〈

5 - 40% 40 - 80%

-1 -0.5 0 0.5 1

-0.4

-0.2 0 0.2 0.4