1/3 /2) part (N 1 2 3 4 5 6

)>_2ϕΔ )d(_1ϕΔ N/d( 2 d trig

<1/N

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 )π,π Away (

1.38) π 1.38, ±π Off-Diag. (

Statistical Systematic

1.38) ±π 1.38, ±π On-Diag. (