00ρ

0 100 200 300 0 0.2 0.4 0.6 0.8_{*0} K

ϕ

<2.0 GeV/c T 0.8<p <5.0 GeV/c T 2.0<p

<2.0 GeV/c T 0.4<p <5.0 GeV/c T 2.0<p

= 1/3 00ρ

> part <N