NEF 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Normalized Jet Yield

-5 10

-4 10

-3 10

-2 10

-1 10 1 a)

< 11.4 GeV/c T 6.2 < p HT1 data JP1 data MB data NEF 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -5 10

-4 10

-3 10

-2 10

-1 10 1 b)

< 32.2 GeV/c T 17.3 < p HT2 data JP2 data